Wavelenght (A))

6800 6810 6820 6830 6840 6850 6860

relative intensity

0

1

2

3

4

5

6

7

8

2015-10-01

2015-10-08

2015-10-11

2015-10-13

2015-10-20

2015-10-25

2015-11-01

2015-11-13

2015-11-25

2015-12-07

2015-12-12

2015-12-23

2015-12-29

ag peg | Raman OVI 6828